Copyright: Copyright © 1998 Charon Software, All Rights Reserved


Contents

Properties and Methods

 Charon Software Hyperlink ActiveX Control

Copyright © 1998 Charon Software, All Rights Reserved

Please visit the Hyperlink Control home page on the Internet at http://www.charonsoftware.com/activex/hyperlink/

Description of control:

Hyperlink is a 32-bit ActiveX control for Visual Basic (and other languages) that allows you to launch a web browser or Internet email program simply by clicking on the hyperlink! This control is particularly useful for linking to web pages directly from your application or providing your customers with an email address that they can simply click on to write you mail.

This control is a free gift to you from Charon Software.  You may include the OCX with all your applications without any royalty fees to pay!  Also, upgrades to this control are always free from http://www.charonsoftware.com.  Sorry, but there is no technical support available for this control.


Hyperlink Properties and Methods

Properties and Methods

The following properties are provided by Charon Software's Hyperlink control:

URL

Usage:	URL(stURL As String)

URL() As String

Description: Sets or retrieves the URL that will be launched when the user clicks on the Hyperlink.

(Examples Follow)

csHyperlink1.URL = "http://www.charonsoftware.com/"

csHyperlink1.URL = "mailto:sales@charonsoftware.com"

funURL = csHyperlink1.URL

The following methods are provided by Charon Software's Hyperlink control:

AboutBox

Usage: AboutBox()

Description: Invoking this method of the Hyperlink control will simply show a window with information about the control itself.

Example: csHyperlink1.AboutBox